SLAC Magnetic Measurements Shim Analysis

Shim Name: SET-GAP Analysis Name: SN 33, BscanZ Runs 51 and 86,SET_GAP

0 50 100 150 200 250

-0.005

0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

SN 33, BscanZ Runs 51 and 86,SET_GAP

Pole Number, No Ends dB / B

Requested Actual