0.3427 0.3577 0.3727 0.3877 0.4027 0.4177 0.4327 0.4477 0.4627

-1.5

-1

-0.5

0

0.5

1

1.5

First-pole: z = 0.372733 m

Und26-DS0001-Run45-y+000-FirstPolePlot.jpg

SLAC Magnetic Measurements Shim Analysis

Shim Name: SET-GAP Analysis Name: SN 26, BscanZ Runs 44 and 45,SET_GAP

0 50 100 150 200 250 -2

-1

0

1

2

3

4

5 x 10^{-3}

SN 26, BscanZ Runs 44 and 45,SET_GAP

Pole Number, No Ends dB / B

Requested Actual