-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -2

-1.5

-1

-0.5

0

0.5

1

1.5

2 x 10^{-6} X Trajectory

X (m)

Z position (m)

13 46 80 113 146 180 213 Pole

SLAC Magnetic Measurements Shim Analysis

Shim Name: SET-GAP Analysis Name: SN 09, BscanZ Runs 19 and 36,SET_GAP

0 50 100 150 200 250

-0.045

-0.04

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

SN 09, BscanZ Runs 19 and 36,SET_GAP

Pole Number, No Ends dB / B

Requested Actual