SLAC Magnetic Measurements# Date: 08-14-2020# Time: 08:31:06#

0 5 10 15 20 25 30 35

Serial Number -0.01 0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

Ave Gap Change (mm)

Gap Change After Beam Pipe Install

0 5 10 15 20 25 30 35 Serial Number

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

Ave Gap Change (mm)

Gap Change After Beam Pipe Install