0 5 10 15 20 25 SXU ID 0

5

10

15

20

25

30

35

(K_{pole}/<K_{pole}>-1)_{rms} at Commissioning Gap (10^{-4})

SXU_Final_Results_Z_Scans <(K_{pole}/<K_{pole}>-1)_{rms}>=(12.45299±9.90290)×10^{-4}

<Commissioning Gap>=(10.394±0.026) mm