0 5 10 15 20 25 SXU ID

-5.5

-5

-4.5

-4

-3.5

-3

-2.5

-2

-1.5

-1 rel K_{eff} Hysteresis (10^{-4})

SXU_Final_Results_Z_Scans

3

4 5

6 7

1

1

2

1 1

1

1

1

1

1

1 2

1

1

1

1

1

1

1

1

1

1

1

<rel K_{eff} Hysteresis>=(-2.7±1.1)×10^{-4}

BBA corrected