0 5 10 15 20 25 SXU ID

38.97

38.98

38.99

39

39.01

39.02

39.03

39.04 u at Commissioning Gap (mm)

SXU_Final_Results_Z_Scans <_u>=(39.00221±0.00051) mm <(_{u,pole}-<_{u,pole}>)_{rms}>=(22.6±4.1) μm

<Commissioning Gap>=(10.394±0.026) mm