0 5 10 15 20 25 SXU ID

7.73

7.74

7.75

7.76

7.77

7.78

7.79

7.8

7.81

7.82 gap (mm) for K=5.43

SXU_Final_Results_Z_Scans

<K=5.43 Gap>=(7.772±0.021) mm