0 5 10 15 20 25 SXU ID

3.3139

3.314

3.3141

3.3142

3.3143

3.3144

3.3145

3.3146

3.3147

3.3148

L_{eff} at Commissioning Gap (m)

SXU_Final_Results_Z_Scans <L_{eff}>=(3.314276±0.000174) m

<Commissioning Gap>=(10.394±0.026) mm