0 5 10 15 20 25 SXU ID

4.205

4.21

4.215

4.22

4.225

4.23

4.235

4.24

4.245

4.25

4.255

K_{eff} at Tuning Gap

SXU_Final_Results_Z_Scans <K_{eff}>=4.2261±0.0118 ( K_{eff})_{rms}/<K_{eff}>=28.0×10^{-4}

Tuning Gap = 10 mm BBA corrected