0 5 10 15 20 25 SXU ID

4.0494

4.0496

4.0498

4.05

4.0502

4.0504

4.0506

4.0508

K_{eff} at Commissioning Gap

SXU_Final_Results_Z_Scans

3 4

5

6 7

1

1

2

1

1

1

1 1

1 1

1

2 1

1

1 1

1

1

1

1

1

1 1

<K_{eff}>=(4.05001±0.00030) mm ( K_{eff})_{rms}/<K_{eff}>=0.7×10^{-4}

<Commissioning Gap>=(10.394±0.026) mm BBA corrected