0 5 10 15 20 25 SXU ID

3.1678

3.1679

3.168

3.1681

3.1682

3.1683

3.1684

3.1685

Cell Phase at Commissioning Gap (degXray)

10^4 SXU_Final_Results_Z_Scans

3 4

5

6

7

1

1

2

1

1

1

1

1 1

1

1

2

1

1

1

1

1

1

1 1

1

1

1

<_{cell}>=(31,680.7±1.3) degXray =((88*360+0.7)±1.3) degXray

<Commissioning Gap>=(10.394±0.026) mm BBA corrected