SLAC Magnetic Measurements# Date: 07-18-2018# Time: 17:34:48#

17:00 17:10 17:20 17:30 17:40

Time Jul 18, 2018 21.55

21.6

21.65

21.7

(deg C)

Sensor 1: Temperature Lower Jaw, Magnet 12

17:00 17:10 17:20 17:30 17:40 Time Jul 18, 2018

20.88

20.9

20.92

20.94

20.96

20.98

21

21.02

(deg C)

Sensor 2: Temperature Lower Jaw, Magnet 22

17:00 17:10 17:20 17:30 17:40

Time Jul 18, 2018 21.62

21.64

21.66

21.68

21.7

21.72

21.74

21.76

21.78

(deg C)

Sensor 3: Temperature Upper Jaw, Magnet 12

17:00 17:10 17:20 17:30 17:40 Time Jul 18, 2018

21.38

21.4

21.42

21.44

21.46

21.48

21.5

21.52

(deg C)

Sensor 4: Temperature Upper Jaw, Magnet 22

17:00 17:10 17:20 17:30 17:40

Time Jul 18, 2018 19.8

20

20.2

20.4

20.6

20.8

21

21.2

21.4

(deg C)

Sensor 5: Temperature Beam Pipe Top, Magnet 17

17:00 17:10 17:20 17:30 17:40 Time Jul 18, 2018

19.6

19.8 20 20.2

20.4

20.6

20.8 21 21.2

21.4

(deg C)

Sensor 6: Temperature Beam Pipe Bottom, Magnet 17

17:00 17:10 17:20 17:30 17:40

Time Jul 18, 2018 19.6 19.8 20 20.2 20.4 20.6 20.8 21 21.2 21.4

(deg C)

Sensor 7: Temperature Beam Pipe Water In

17:00 17:10 17:20 17:30 17:40 Time Jul 18, 2018

19.8

20

20.2

20.4

20.6

20.8

21

21.2

(deg C)

Sensor 8: Temperature Beam Pipe Water Out

17:00 17:10 17:20 17:30 17:40

Time Jul 18, 2018 21.272

21.274

21.276

21.278

21.28

21.282

21.284

21.286

21.288

(deg C)

Sensor 9: Temperature Undulator Strongback

17:00 17:10 17:20 17:30 17:40 Time Jul 18, 2018

19.5

20

20.5

21

21.5

22

Temperature (deg C)

Temperature Measurements

Sensor 1 Sensor 2 Sensor 3 Sensor 4 Sensor 5 Sensor 6 Sensor 7 Sensor 8 Sensor 9