SLAC Magnetic Measurements# Date: 07-18-2018# Time: 16:59:24#

16:20 16:30 16:40 16:50 17:00

Time Jul 18, 2018 21.52

21.54

21.56

21.58

21.6

21.62

21.64

21.66

21.68

(deg C)

Sensor 1: Temperature Lower Jaw, Magnet 12

16:20 16:30 16:40 16:50 17:00 Time Jul 18, 2018

20.84

20.86

20.88

20.9

20.92

20.94

20.96

20.98 21 21.02

(deg C)

Sensor 2: Temperature Lower Jaw, Magnet 22

16:20 16:30 16:40 16:50 17:00

Time Jul 18, 2018 21.58

21.6

21.62

21.64

21.66

21.68

21.7

21.72

21.74

(deg C)

Sensor 3: Temperature Upper Jaw, Magnet 12

16:20 16:30 16:40 16:50 17:00 Time Jul 18, 2018

21.35

21.4

21.45

21.5

(deg C)

Sensor 4: Temperature Upper Jaw, Magnet 22

16:20 16:30 16:40 16:50 17:00

Time Jul 18, 2018 19.8

20

20.2

20.4

20.6

20.8

21

21.2

21.4

(deg C)

Sensor 5: Temperature Beam Pipe Top, Magnet 17

16:20 16:30 16:40 16:50 17:00 Time Jul 18, 2018

19.8

20

20.2

20.4

20.6

20.8

21

21.2

21.4

(deg C)

Sensor 6: Temperature Beam Pipe Bottom, Magnet 17

16:20 16:30 16:40 16:50 17:00

Time Jul 18, 2018 19.6

19.8

20

20.2

20.4

20.6

20.8

21

21.2

(deg C)

Sensor 7: Temperature Beam Pipe Water In

16:20 16:30 16:40 16:50 17:00 Time Jul 18, 2018

19.8

20

20.2

20.4

20.6

20.8

21

21.2

(deg C)

Sensor 8: Temperature Beam Pipe Water Out

16:20 16:30 16:40 16:50 17:00

Time Jul 18, 2018 21.256

21.258

21.26

21.262

21.264

21.266

21.268

21.27

21.272

(deg C)

Sensor 9: Temperature Undulator Strongback

16:20 16:30 16:40 16:50 17:00 Time Jul 18, 2018

19.5

20

20.5

21

21.5

22

Temperature (deg C)

Temperature Measurements

Sensor 1 Sensor 2 Sensor 3 Sensor 4 Sensor 5 Sensor 6 Sensor 7 Sensor 8 Sensor 9