SLAC Magnetic Measurements# Date: 09-04-2018# Time: 17:13:57#

11:00 12:00 13:00 14:00 15:00 16:00 17:00

Time Sep 04, 2018 21.875

21.88

21.885

21.89

21.895

21.9

21.905

21.91

(deg C)

Sensor 1: Temperature Magnet 12 Lower Jaw

11:00 12:00 13:00 14:00 15:00 16:00 17:00 Time Sep 04, 2018

21.225

21.23

21.235

21.24

21.245

21.25

21.255

(deg C)

Sensor 2: Temperature Magnet 22 Lower Jaw

11:00 12:00 13:00 14:00 15:00 16:00 17:00

Time Sep 04, 2018 22.03

22.04

22.05

22.06

22.07

22.08

22.09

(deg C)

Sensor 3: Temperature Magnet 12 Upper Jaw

11:00 12:00 13:00 14:00 15:00 16:00 17:00 Time Sep 04, 2018

21.775

21.78

21.785

21.79

21.795

21.8

21.805

21.81

21.815

21.82

21.825

(deg C)

Sensor 4: Temperature Magnet 22 Upper Jaw

11:00 12:00 13:00 14:00 15:00 16:00 17:00

Time Sep 04, 2018 21.5

21.55

21.6

21.65

21.7

21.75

(deg C)

Sensor 5: Temperature Beam Pipe Top At Magnet 17

11:00 12:00 13:00 14:00 15:00 16:00 17:00 Time Sep 04, 2018

21.4

21.45

21.5

21.55

21.6

21.65

(deg C)

Sensor 6: Temperature Beam Pipe Bottom At Magnet 17

11:00 12:00 13:00 14:00 15:00 16:00 17:00

Time Sep 04, 2018 21.1

21.2

21.3

21.4

21.5

21.6

21.7

(deg C)

Sensor 7: Temperature Beam Pipe Water In

11:00 12:00 13:00 14:00 15:00 16:00 17:00 Time Sep 04, 2018

21.35

21.4

21.45

21.5

21.55

21.6

21.65

21.7

21.75

21.8

(deg C)

Sensor 8: Temperature Beam Pipe Water Out

11:00 12:00 13:00 14:00 15:00 16:00 17:00

Time Sep 04, 2018 20

20.5

21

21.5

22

22.5

(deg C)

Sensor 9: Temperature Ambient

11:00 12:00 13:00 14:00 15:00 16:00 17:00 Time Sep 04, 2018 20

20.5

21

21.5

22

22.5

Temperature (deg C)

Temperature Measurements

Sensor 1 Sensor 2 Sensor 3 Sensor 4 Sensor 5 Sensor 6 Sensor 7 Sensor 8 Sensor 9