0 5 10 15 20 25 30 35 HXU ID

3.326

3.3262

3.3264

3.3266

3.3268

3.327

3.3272

L_{eff} at Commissioning Gap (m)

HXU_Final_Results_Z_Scans <L_{eff}>=(3.326636±0.000217) m

<Commissioning Gap>=(7.922±0.032) mm