0 5 10 15 20 25 30 35 HXU ID

1.97

1.98

1.99

2

2.01

2.02

2.03

K_{eff} at Tuning Gap

HXU_Final_Results_Z_Scans <K_{eff}>=1.9987±0.0091 ( K_{eff})_{rms}/<K_{eff}>=45.7×10^{-4}

Tuning Gap = 10 mm BBA corrected