0 5 10 15 20 25 30 35 HXU ID

2.3395

2.3396

2.3397

2.3398

2.3399

2.34

2.3401

2.3402

2.3403

K_{eff} at Commissioning Gap

HXU_Final_Results_Z_Scans

1

1

2

1

1

1

1 2

1 1

1

1

1

1

4

1 1

1

1

1

2

1

2

1

2

1

1

1

2 1

1

1

1

1

1 1

1

1

1

1

<K_{eff}>=(2.33986±0.00015) mm ( K_{eff})_{rms}/<K_{eff}>=0.6×10^{-4}

<Commissioning Gap>=(7.922±0.032) mm BBA corrected