0 5 10 15 20 25 30 35 HXU ID

7.56

7.58

7.6

7.62

7.64

7.66

7.68

7.7

7.72

7.74

7.76 gap (mm) for K=2.44

HXU_Final_Results_Z_Scans

<K=2.44 Gap>=(7.643±0.031) mm