6 8 10 12 14 16 18 20 22

Gap(mm) -25

-20

-15

-10

-5

0

5

10

15

20

25

μTm

Shim signature of no magnet

∫ Bxdz

6 8 10 12 14 16 18 20 22

Gap(mm) -60

-40

-20

0

20

40

60

80

μTm_2

Shim signature of no magnet

∫∫ Bxdzdz

6 8 10 12 14 16 18 20 22

Gap(mm) -30

-20

-10

0

10

20

30

40

μTm

Shim signature of no magnet

∫ Bydz

6 8 10 12 14 16 18 20 22

Gap(mm) -80

-60

-40

-20

0

20

40

60

80

100

μTm_2

Shim signature of no magnet

∫∫ Bydzdz