SLAC Magnetic Measurements# Date: 09-13-2018# Time: 14:45:40#

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

Data Set 10.03 10.035 10.04 10.045 10.05 10.055 10.06 10.065 10.07 10.075 10.08

Gap (mm)

Reference Phase Shifter, Capacitive Sensor Gap

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 Data Set

9.0264

9.0266

9.0268

9.027

9.0272

9.0274

9.0276

9.0278

9.028

9.0282

9.0284

Dist (mm)

Calib, Dist Btwn Cap Sen