SLAC Magnetic Measurements# Date: 11-18-2017# Time: 18:35:50#

-10 -8 -6 -4 -2 0 2 4 6 8 10

X (mm) -1

-0.5

0

0.5

1

1.5

2

2.5

I1x (Tm)

10_{-5} I1x vs X, Y = 0

Gap = 10.00 mm

Gap = 15.00 mm

Gap = 20.00 mm

Gap = 30.00 mm

Gap = 100.00 mm

-10 -8 -6 -4 -2 0 2 4 6 8 10 X (mm) -3

-2

-1

0

1

2

3

I1y (Tm)

10^{-5} I1y vs X, Y = 0

Gap = 10.00 mm Gap = 15.00 mm Gap = 20.00 mm Gap = 30.00 mm Gap = 100.00 mm

-10 -8 -6 -4 -2 0 2 4 6 8 10

X (mm) -6

-4

-2

0

2

4

6

I2x (T m**2)

10_{-5} I2x vs X, Y = 0

Gap = 10.00 mm

Gap = 15.00 mm

Gap = 20.00 mm

Gap = 30.00 mm

Gap = 100.00 mm

-10 -8 -6 -4 -2 0 2 4 6 8 10 X (mm) -4 -3 -2 -1 0 1 2 3 4 5

I2y (T m**2)

10^{-5} I2y vs X, Y = 0

Gap = 10.00 mm Gap = 15.00 mm Gap = 20.00 mm Gap = 30.00 mm Gap = 100.00 mm