SLAC Magnetic Measurements# Date: 09-13-2018# Time: 14:36:24#

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

Data Set 10.14 10.142 10.144 10.146 10.148 10.15 10.152 10.154 10.156 10.158 10.16

Gap (mm)

Reference Phase Shifter, Capacitive Sensor Gap

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 Data Set

9.022

9.023

9.024

9.025

9.026

9.027

9.028

Dist (mm)

Calib, Dist Btwn Cap Sen