SLAC Magnetic Measurements# Date: 12-12-2018# Time: 15:04:25#

10 20 30 40 50 60 70 80 90 100

Gap (mm) 0

2

4

6

8

10

12

14

First Integral ( Tm)

Fit I1X vs Gap, X = 0, Y = 0

Meas

Spline Pts

0 5 10 15 20 25 30 Gap (mm) 0 1 2 3 4 5 6 7 8 9 10

First Integral ( Tm)

Fit I1X vs Gap, X = 0, Y = 0

Meas Spline Pts

10 20 30 40 50 60 70 80 90 100

Gap (mm) -14 -13 -12 -11 -10 -9 -8 -7 -6 -5 -4

First Integral ( Tm)

Fit I1Y vs Gap, X = 0, Y = 0

Meas

Spline Pts

0 5 10 15 20 25 30 Gap (mm) -12

-11

-10

-9

-8

-7

-6

-5

-4

First Integral ( Tm)

Fit I1Y vs Gap, X = 0, Y = 0

Meas Spline Pts

10 20 30 40 50 60 70 80 90 100

Gap (mm) -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 3

Second Integral ( Tm_2)

Fit I2X vs Gap, X = 0, Y = 0

Meas

Spline Pts

0 5 10 15 20 25 30 Gap (mm)

-0.5

0

0.5

1

1.5

2

2.5

Second Integral ( Tm^2)

Fit I2X vs Gap, X = 0, Y = 0

Meas Spline Pts

10 20 30 40 50 60 70 80 90 100

Gap (mm) -3.5

-3

-2.5

-2

-1.5

-1

-0.5

0

0.5

Second Integral ( Tm_2)

Fit I2Y vs Gap, X = 0, Y = 0

Meas

Spline Pts

0 5 10 15 20 25 30 Gap (mm)

-3.5

-3

-2.5

-2

-1.5

-1

-0.5

0

0.5

Second Integral ( Tm^2)

Fit I2Y vs Gap, X = 0, Y = 0

Meas Spline Pts