SLAC Magnetic Measurements# Date: 06-09-2021# Time: 11:30:38#

0 100 200 300 400 500 600 700 800 900 1000

Time (sec) 0.79 0.8 0.81 0.82 0.83 0.84 0.85 0.86 0.87 0.88

B (G)

Field Measurement Samples