SLAC Magnetic Measurements# Date: 07-14-2023# Time: 09:08:35#

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017461 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017475 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017487 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017502 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017513 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017529 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017544 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017551 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017570 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017583 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017598 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017612 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017623 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017627 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017631 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017645 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017656 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017671 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017678 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017676 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017684 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017693 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017703 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017714 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017726 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017738 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017753 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017762 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017775 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017789 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017803 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017815 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017825 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017835 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017853 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017863 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017875 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017885 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017896 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017908 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017915 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017925 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017935 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017949 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017952 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017965 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017979 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017989 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017994 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.018006 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.018016 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.018022 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.018036 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.018045 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.018057 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.018065 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.018077 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.018095 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.018105 m

X12

X23 X34

X45 1

2

3

4

5