SLAC Magnetic Measurements# Date: 03-02-2023# Time: 15:03:34#

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017566 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017572 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017597 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017593 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017595 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017614 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017618 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017596 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017593 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017593 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017602 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017612 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017627 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017650 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017686 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017836 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017766 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017718 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017724 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017722 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017699 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017700 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017730 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017672 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017550 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017674 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017762 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017803 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017816 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017811 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017797 m

X12

X23 X34

X45 1

2

3

4

5