SLAC Magnetic Measurements# Date: 01-30-2023# Time: 19:00:20#

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017918 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017894 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017898 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017871 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017893 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017899 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017900 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017924 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017920 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017905 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017871 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017863 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017906 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017973 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017777 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017625 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017749 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017768 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017780 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017779 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017757 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017750 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017821 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017861 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017887 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017868 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017752 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017536 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017277 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017371 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017511 m

X12

X23 X34

X45 1

2

3

4

5