SLAC Magnetic Measurements# Date: 12-15-2016# Time: 11:58:37#

0.006 0.008 0.01 0.012 0.014 0.016 0.018 0.02 0.022

Gap (m) 0.5

1

1.5

2

2.5

3

3.5

4

Keff

Fit Keff vs Gap

Fit:

Use only odd points within 2 mm of a given point in fit.

Fit odd points with a (Np - 2)th order polynomial.

0.006 0.008 0.01 0.012 0.014 0.016 0.018 0.02 0.022 Gap (m)

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

K Residual

10^{-4} K vs Gap, Fit Residuals

0.006 0.008 0.01 0.012 0.014 0.016 0.018 0.02 0.022

Gap (m) -14 -12 -10 -8 -6 -4 -2 0 2 4 6

K Residual / K

10_{-5} K vs Gap, Fit Normalized Residuals