0 0.5 1 1.5 2 2.5 3 3.5 4 K -0.06

-0.04

-0.02

0

0.02

0.04

0.06

0.08

0.1

K Residuals

K Residuals vs K

Fit: Ksq = c1*cos((ku/2)*(delta13+c5)).2 + c2*sin((ku/2)*(delta13+c5)).2 + c3*cos((ku/2)*(delta24+c6)).2 + c4*sin((ku/2)*(delta24+c6)).2 Coefficients: c1 = 0.074738 c2 = 0.018498 c3 = 13.0284 c4 = 7.0194e-09 c5 = -0.0018566 c6 = -9.3541e-05

LPVMF LPHMF CPRMF CPLMF