0 0.5 1 1.5 2 2.5 3 3.5 4 K -0.1

-0.08

-0.06

-0.04

-0.02

0

0.02

0.04

K Residuals

K Residuals vs K

Fit: Ksq = c1*cos((ku/2)*(delta13+c5)).2 + c2*sin((ku/2)*(delta13+c5)).2 + c3*cos((ku/2)*(delta24+c6)).2 + c4*sin((ku/2)*(delta24+c6)).2 Coefficients: c1 = 6.2417 c2 = 0.022837 c3 = 6.574 c4 = 0.020465 c5 = -0.00020448 c6 = -0.00017538

LPVMF LPHMF CPRMF CPLMF LP13F LP13N LP24F LP24N