-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -2

-1.5

-1

-0.5

0

0.5

1

1.5

2 x 10^{-6} Y Trajectory

Y (m)

Z position (m)

13 46 80 113 146 180 213 Pole

SLAC Magnetic Measurements Mechanical Measurement Analysis

Parameters: INPUT-FILE-DIR =S:\MagData\LCLS\Undulator\L143-112000-39\DATASET0001\MECHANICAL MEASUREMENTS\DATA\ INPUT-FILE-NAME =SN39 POLE TIP DATA POINTS - PRETUNING 28-SEP-2007.TXT