SLAC Magnetic Measurements Shim Analysis

Shim Name: SET-GAP Analysis Name: SN 21, BscanZ Runs 9 and 13,SET_GAP

0 50 100 150 200 250 0

0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

SN 21, BscanZ Runs 9 and 13,SET_GAP

Pole Number, No Ends dB / B

Requested Actual