-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

1.5

2

2.5 x 10^{-3} Bx vs Z

Z Position (m)

Bx (T)

13 46 80 113 146 180 213 Pole

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-1.5

-1

-0.5

0

0.5

1

1.5 By vs Z

Z Position (m)

By (T)

13 46 80 113 146 180 213 Pole

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -2

-1.5

-1

-0.5

0

0.5

1

1.5

2 x 10^{-6} X Trajectory

X (m)

Z position (m)

13 46 80 113 146 180 213 Pole

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -2

-1.5

-1

-0.5

0

0.5

1

1.5

2 x 10^{-6} Y Trajectory

Y (m)

Z position (m)

13 46 80 113 146 180 213 Pole

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -10

-8

-6

-4

-2

0

2

4

6

8

10 Phase Error At Field Peaks, No Ends

Phase Error (deg)

Z position (m)

13 46 80 113 146 180 213 Pole

Phase Error: Ave = -0.000000 deg, RMS = 3.477269 deg

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -25

-20

-15

-10

-5

0

5

10 Phase Error Relative To Nominal Radiation Wave At Field Peaks, No Ends

Phase Error (deg)

Z position (m)

13 46 80 113 146 180 213 Pole