SLAC Magnetic Measurements PPM Undulator Simulation Parameters: OUTPUT-FILE-DIR =C:\Magdata\Echo7 U20 Sim\Pole8 dgap-100mic\

0 0.05 0.1 0.15 0.2 0.25

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

0.01

0.015

0.02

0.025

Permanent Magnet Blocks And Charges

Z Position (m)

Y Position (m)

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

0.01

0.015

0.02

0.025

Magnetic Field On Line At X = 0 m, Y = 0 m

Z Position (m)

Y Position (m)

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8 By vs Z On Line At X = 0 m, Y = 0 m

Z (m)

By (T)