-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3

-0.01

-0.008

-0.006

-0.004

-0.002

0

0.002

0.004

0.006

0.008

0.01

Bx vs Z

Z Position (m)

Bx (T)

2 12 22 Pole

-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8 By vs Z

Z Position (m)

By (T)

2 12 22 Pole

-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 -3

-2

-1

0

1

2

3 x 10^{-5} X Trajectory

X (m)

Z position (m)

2 12 22 Pole

-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 -3

-2.5

-2

-1.5

-1

-0.5

0 x 10^{-4} Y Trajectory

Y (m)

Z position (m)

2 12 22 Pole

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 -6

-4

-2

0

2

4

6 Phase Error At Field Peaks, No Ends

Phase Error (deg)

Z position (m)

4 6 8 10 12 14 16 18 20 Pole

Phase Error: Ave = -0.000000 deg, RMS = 3.370801 deg

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 182

184

186

188

190

192

194

196 Phase Error Relative To Nominal Radiation Wave At Field Peaks, No Ends

Phase Error (deg)

Z position (m)

4 6 8 10 12 14 16 18 20 Pole