SLAC Magnetic Measurements# Date: 08-16-2017# Time: 07:43:29#

0 20 40 60 80 100 120 140 160 180

Gap (mm) -25

-20

-15

-10

-5

0

5

10

15

First Integral ( Tm)

Fit I1X vs Gap, X = 0, Y = 0

Measurements Fit

0 20 40 60 80 100 120 140 160 180 Gap (mm)

-100

-80

-60

-40

-20

0

20

40

First Integral ( Tm)

Fit I1Y vs Gap, X = 0, Y = 0

Measurements Fit

0 20 40 60 80 100 120 140 160 180

Gap (mm) -40

-20

0

20

40

60

80

Second Integral ( Tm_2)

Fit I2X vs Gap, X = 0, Y = 0

Measurements Fit

0 20 40 60 80 100 120 140 160 180 Gap (mm)

-400

-300

-200

-100

0

100

200

Second Integral ( Tm^2)

Fit I2Y vs Gap, X = 0, Y = 0

Measurements Fit