SLAC Magnetic Measurements# Date: 04-18-2019# Time: 10:44:45#

6 8 10 12 14 16 18 20 22

Gap (mm) -30

-20

-10

0

10

20

30

40

Pitch (microrad)

Pitch vs Gap

Gap Opening

Gap Closing