SLAC Magnetic Measurements# Date: 08-09-2017# Time: 17:08:51#

5 10 15 20 25 30 35 40 45 50

Gap (mm) -20

0

20

40

60

80

100

120

Centerline Height (microns)

Undulator Center Height vs Gap

Meas

4th Order Fit

5 10 15 20 25 30 35 40 45 50 Gap (mm) -12 -10 -8 -6 -4 -2 0 2 4 6 8

Centerline Height (microns)

Undulator Center Height vs Gap, Fit Residuals

0 20 40 60 80 100 120 140 160 180 200

Gap (mm) -20

0

20

40

60

80

100

120

Centerline Height (microns)

Undulator Center Height vs Gap

Meas

4th Order Fit

Spline