0 5 10 15 20 25 30 35 HXU ID

7.84

7.86

7.88

7.9

7.92

7.94

7.96

7.98

8

8.02

8.04

Commissioning Gap (mm)

HXU_Final_Results_Z_Scans <Commissioning Gap>=(7.922±0.032) mm