SLAC Magnetic Measurements# Date: 04-28-2022# Time: 15:43:19#

0 2000 4000 6000 8000 10000

Time (sec) sec 19.65

19.7

19.75

19.8

19.85

Temperature (Deg C)

T1: Water In

0 2000 4000 6000 8000 10000 Time (sec) sec

20.5

20.6

20.7

20.8

20.9

21

21.1

21.2

Temperature (Deg C)

T2: After Heater

0 2000 4000 6000 8000 10000

Time (sec) sec 20.4

20.5

20.6

20.7

20.8

20.9

21

21.1

Temperature (Deg C)

T3: Beam Pipe