2 3 4 5 6 7 8 9 10 11 12 Data Set

10.23

10.235

10.24

10.245

10.25

10.255

10.26

10.265

Gap (mm)

Reference Phase Shifter Gap

dPI/dg = -394.906800 T**2 mm**3 / mm