SLAC Magnetic Measurements# Date: 12-10-2020# Time: 21:26:39#

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) 280

300

320

340

360

380

400

420

Magnetic Length (mm)

Magnetic Length vs Gap