SLAC Magnetic Measurements# Date: 12-07-2017# Time: 16:43:19#

0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 1.05

Z (m) -1.5

-1

-0.5

0

0.5

1

1.5

Bx (T)

10_{-4} Bx vs Z, Hall Probe and Fluxgate

0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 1.05 Z (m) -6

-4

-2

0

2

4

6

8

Bx (T)

10^{-5} Filtered Bx vs Z, Hall Probe and Fluxgate

0 2 4 6 8 10 12

Measurement Number -8 -6 -4 -2 0 2 4 6 8 10 12

I1x (Tm)

10_{-6} I1x vs Meas Num, Hall Probe and Fluxgate

0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 1.05 Z (m) -2

-1.5

-1

-0.5

0

0.5

1

1.5

By (T)

10^{-4} By vs Z, Hall Probe and Fluxgate

0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 1.05

Z (m) -12 -10 -8 -6 -4 -2 0 2 4 6

By (T)

10_{-5} Filtered By vs Z, Hall Probe and Fluxgate

0 2 4 6 8 10 12 Measurement Number

-2.5

-2

-1.5

-1

-0.5

0

0.5

I1y (Tm)

10^{-5} I1y vs Meas Num, Hall Probe and Fluxgate