0 10 20 30 40 50 60 70 80 90 100 Gap (mm) -80 -70 -60 -50 -40 -30 -20 -10 0 10

G-cm/cm

Shim signature

HESXU, 09-30-2022 +-25um; Normal quad

B_Ydz

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) -4 -2 0 2 4 6 8 10 12

G-cm/cm

Shim signature

HESXU, 09-30-2022

+-25um; Normal quad

dB^x /dx

0 10 20 30 40 50 60 70 80 90 100 Gap (mm) -80 -70 -60 -50 -40 -30 -20 -10 0 10

G-cm/cm

Shim signature

HESXU, 09-30-2022 +-25um; Normal quad

B_Ydz

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) -4 -2 0 2 4 6 8 10 12

G-cm/cm

Shim signature

HESXU, 09-30-2022

+-25um; Normal quad

dB^x /dx

0 10 20 30 40 50 60 70 80 90 100 Gap (mm) -20 0 20 40 60 80 100 120 140 160

G-cm/cm

Shim signature

HESXU, 09-30-2022 +-25um; Normal quad

B_Ydz

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) -25 -20 -15 -10 -5 0 5 10

G-cm/cm

Shim signature

HESXU, 09-30-2022

+-25um; Normal quad

dB^x /dx

0 10 20 30 40 50 60 70 80 90 100 Gap (mm) -20 0 20 40 60 80 100 120 140 160

G-cm/cm

Shim signature

HESXU, 09-30-2022 +-25um; Normal quad

B_Ydz

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) -25 -20 -15 -10 -5 0 5 10

G-cm/cm

Shim signature

HESXU, 09-30-2022

+-25um; Normal quad

dB^x /dx

0 10 20 30 40 50 60 70 80 90 100 Gap (mm) -20 0 20 40 60 80 100 120 140 160

G-cm/cm

Shim signature

HESXU, 09-30-2022 +-25um; Normal quad

B_Ydz

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) -25 -20 -15 -10 -5 0 5 10

G-cm/cm

Shim signature

HESXU, 09-30-2022

+-25um; Normal quad

dB^x /dx

0 10 20 30 40 50 60 70 80 90 100 Gap (mm) -20 0 20 40 60 80 100 120 140 160

G-cm/cm

Shim signature

HESXU, 09-30-2022 +-25um; Normal quad

B_Ydz

0 10 20 30 40 50 60 70 80 90 100

Gap (mm) -25 -20 -15 -10 -5 0 5 10

G-cm/cm

Shim signature

HESXU, 09-30-2022

+-25um; Normal quad

dB^x /dx