SLAC Magnetic Measurements# Date: 07-10-2023# Time: 16:13:01#

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017413 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017421 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017428 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017436 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017440 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017449 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017457 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017459 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017470 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017475 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017486 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017494 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017497 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017495 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017493 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017501 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017506 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017512 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017515 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017506 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017508 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017512 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017518 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017517 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017523 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017529 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017534 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017539 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017546 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017555 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017560 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017567 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017571 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017574 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017586 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017589 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017594 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017596 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017603 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017606 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017609 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017614 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017615 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017623 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017623 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017628 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017633 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017638 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017636 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017640 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017644 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017645 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017652 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017654 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017658 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017661 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017666 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017678 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017682 m

X12

X23 X34

X45 1

2

3

4

5