SLAC Magnetic Measurements# Date: 03-03-2023# Time: 13:34:02#

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017551 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017548 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017547 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017544 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017543 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017544 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017543 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017539 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017537 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017533 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017530 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017527 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017525 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017524 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017522 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017520 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017520 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017520 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017523 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017519 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017517 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017514 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017512 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017509 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017503 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017499 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017494 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017493 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017494 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017489 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017487 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017492 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017494 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017492 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017490 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017493 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017494 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017495 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017495 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017495 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017495 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017493 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017492 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017489 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017488 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017487 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017485 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017487 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017486 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017486 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017486 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017488 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017493 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017493 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017497 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017499 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017500 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017499 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017498 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017499 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017501 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017503 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017505 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017506 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017507 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017509 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017512 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017516 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017521 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017524 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017521 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017521 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017520 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017519 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017520 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017523 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017526 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017523 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017524 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017526 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017529 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017531 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017532 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017534 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017537 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017538 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017539 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017539 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017546 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017548 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017550 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017554 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017556 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017555 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017555 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017550 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017551 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017551 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017550 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017550 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017547 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017545 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017545 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017539 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017543 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017538 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017537 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017541 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017544 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017548 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017547 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017547 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017549 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017553 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017553 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017553 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017554 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017554 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017552 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017554 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017551 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017548 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017546 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017542 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017537 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017534 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017531 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.017529 m

X12

X23 X34

X45 1

2

3

4

5

0.013 0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.017525 m

X12

X23 X34

X45 1

2

3

4

5