SLAC Magnetic Measurements# Date: 01-30-2023# Time: 12:08:09#

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10_{-3} Voltage vs X

Tube Center

X = 0.017985 m

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10^{-3} Voltage vs X

Tube Center X = 0.017994 m

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10_{-3} Voltage vs X

Tube Center

X = 0.017973 m

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10^{-3} Voltage vs X

Tube Center X = 0.017698 m

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10_{-3} Voltage vs X

Tube Center

X = 0.017838 m

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023 X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10^{-3} Voltage vs X

Tube Center X = 0.017948 m

0.014 0.015 0.016 0.017 0.018 0.019 0.02 0.021 0.022 0.023

X (m) -1

0

1

2

3

4

5

6

7

Voltage (V)

10_{-3} Voltage vs X

Tube Center

X = 0.017495 m