SLAC Magnetic Measurements# Date: 01-28-2023# Time: 13:56:59#

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.021418 m

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.021147 m

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.020903 m

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.020460 m

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.020378 m

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026 X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center X = 0.024318 m

0.018 0.019 0.02 0.021 0.022 0.023 0.024 0.025 0.026

X (m) -3

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

Voltage (V)

Voltage vs X

Tube Center

X = 0.024067 m