SLAC Magnetic Measurements Horizontally Magnetized Block Sort Analysis ------------------------------------------- Parameters: OUTPUT-FILE-DIR =S:\magdata\LCLS-II-HE\Phase Shifter\Magnet Blocks

-4 -3 -2 -1 0 1 2 3 4 5 Mx (Tm**3) 10^{-7} -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

My (Tm**3)

10^{-6} H Blocks, My vs Mx Scatter Plot

Mx, My Outliers

-2 -1.5 -1 -0.5 0 0.5 1

Pair Mx (Tm**3) 10_{-7} 0 1 2 3 4 5 6 7 8 9

Number

H Block Pairs, Pair Mx Histogram Plot

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 Pair My (Tm**3) 10^{-7} 0

1

2

3

4

5

6

Number

H Block Pairs, Pair My Histogram Plot

-2 -1.5 -1 -0.5 0 0.5 1

Mx (Tm**3) 10_{-7} -2

-1.5

-1

-0.5

0

0.5

1

1.5

2

My (Tm**3)

10_{-7} H Block Pairs, My vs Mx Scatter Plot

Mx, My

-4 -3 -2 -1 0 1 2 3 4 5 Mx (Tm^3) 10^{-7} -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

My (Tm^3)

10^{-6} H Blocks And Pairs, My vs Mx Scatter Plot Mx, My Outliers Pair Mx, My